<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% Set 16:9 aspect ratio
\documentclass[aspectratio=169]{mg-beamer}
% Default directive sets the regular 4:3 aspect ratio
% \documentclass{mg-beamer}
\mode&lt;presentation&gt;

% requires xelatex
\usepackage{ccicons}

\title{Insert Presentation Title}
\titlegraphic{\ccbyncnd}
\author{Insert Name}

% Institute doesn't look good in our current styling class.
% \institute[Memgraph Ltd.]{\pgfimage[height=1.5cm]{mg-logo.png}}

% Date is autogenerated on compilation, so no need to set it explicitly,
% unless you wish to override it with a different date.
% \date{March 23, 2018}

\begin{document}

\titleframe

\section{Intro}

\begin{frame}{Contents}
  \tableofcontents
\end{frame}

\begin{frame}{Memgraph Markup Test}
  \begin{itemize}
    \item \mgtexttt{Prefer \\mgtexttt for monospace}
    \item Replace this slide with your own
    \item Add even more slides in different sections
    \item Make sure you spellcheck your presentation
  \end{itemize}
\end{frame}

\end{document}
</pre></body></html>